
    Add Mail Exchanger Host

    This window contains the following fields:

    DNS Server

    You can use this field to specify the DNS Server for this mail
    exchanger. If you leave this field blank, it defaults to the default
    DNS Servers value set in Network --> Host Naming Services.

    Domain Name

    You can use this field to specify the Internet domain name for this
    mail exchanger. If you leave this field blank, it defaults to the
    default domain name value set in Network --> Host Naming Services.

    Hostnames

    Use this field to specify which host machine(s) will act as mail
    host, or mail dispatcher, for the machines in the Domain Name field.
    Leave a blank space between host names for multiple entries.

    Priority

    You can use this field to associate a priority, or preference, to
    using this hostname as a mail host. The number can range from 0 to
    65536 inclusive. The lower the number the higher the priority. You
    can also use the counter buttons to increment or decrement this
    number.

    Add Buttons

    This window contains the following buttons:

    Add

    Click on this button to save the current information as a mail
    exchanger for the Internet domain set in the Domain Name field.

    Clear Fields

    Click on this button to clear the existing choices in all fields.

    Cancel

    Click on this button to close the window without making any changes.

